Performance:

Proteon p4200

100

500

1000

2000

5000

10000

14880

64 128 256 512 1024 1518

Packet Length

Packets per Second

.

• D +*‘

.

•D

+

*‘

.

• D

+

*‘

.

• D

+

*‘ .

•D

+

*‘ .

•D

+

*‘

theoretical hammer max +25% flood filter 1 filter 10

. . .

• • •

D D D

+ + +

* * *

‘ ‘ ‘